From c4eaeee3203a8ed2ebfa4bc792ada3ec4703438e Mon Sep 17 00:00:00 2001
From: crupest <crupest@outlook.com>
Date: Mon, 11 Jan 2021 22:28:58 +0800
Subject: feat: Fix #200.

---
 FrontEnd/src/app/App.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'FrontEnd/src/app/App.tsx')

diff --git a/FrontEnd/src/app/App.tsx b/FrontEnd/src/app/App.tsx
index 6cdf2434..7bd92bf7 100644
--- a/FrontEnd/src/app/App.tsx
+++ b/FrontEnd/src/app/App.tsx
@@ -39,6 +39,7 @@ const App: React.FC = () => {
       <React.Suspense fallback={<LoadingPage />}>
         <Router>
           <AppBar />
+          <div style={{ height: 56 }} />
           <Switch>
             <Route exact path="/">
               <Home />
-- 
cgit v1.2.3

