From 8443f77435a75048587b74615be62f0fefb29bf4 Mon Sep 17 00:00:00 2001
From: crupest <crupest@outlook.com>
Date: Fri, 2 Jul 2021 21:58:53 +0800
Subject: fix: Fix a UI bug in login page.

---
 FrontEnd/src/views/login/index.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'FrontEnd/src/views/login/index.tsx')

diff --git a/FrontEnd/src/views/login/index.tsx b/FrontEnd/src/views/login/index.tsx
index ed696437..a3f0ccd7 100644
--- a/FrontEnd/src/views/login/index.tsx
+++ b/FrontEnd/src/views/login/index.tsx
@@ -134,7 +134,7 @@ const LoginPage: React.FC = (_) => {
           {t("user.rememberMe")}
         </label>
       </div>
-      {error ? <p className="text-danger">{t(error)}</p> : null}
+      {error ? <p className="cru-color-danger">{t(error)}</p> : null}
       <div className="cru-text-end">
         <LoadingButton
           loading={process}
-- 
cgit v1.2.3

